From bd0981867ba8e569e3e2c9b839548a189627df0a Mon Sep 17 00:00:00 2001
From: Vidhu Kant Sharma <vidhukant@vidhukant.com>
Date: Thu, 5 Oct 2023 10:48:15 +0530
Subject: fixed register button still being disabled after password validation
 failure

---
 src/views/Register.vue | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/views/Register.vue')

diff --git a/src/views/Register.vue b/src/views/Register.vue
index c8727d8..5260759 100644
--- a/src/views/Register.vue
+++ b/src/views/Register.vue
@@ -22,6 +22,7 @@ const register = async (e) => {
 
   if (toRaw(password.value) !== toRaw(passwordConfirm.value)) {
     toast.error('Password and confirm password do not match')
+    isLoading.value = false
     return
   }
 
-- 
cgit v1.2.3

